Type Width Lenght n° Width Lenght n° Width Lenght n° Strips Pitch Total strips Width Lenght n° Strips Pitch Total strips

B 1080 5090 128 1104 2425 512 1104 2425 512 32 33,94 16384 2425 1104 512 80 30,09 40960

D 840 5090 64 864 2425 256 864 2425 256 24 35,25 6144 2425 864 256 80 30,09 20480

Total 192 768 768 22528 768 61440

Type Width Lenght n° Width Lenght n° Width Lenght n° Strips Pitch Total strips Width Lenght n° Strips Pitch Total strips

A 1200 3680 64 1194 1720 256 1194 1720 256 40 29,40 10240 1720 1194 256 64 26,59 16384

D 840 3680 192 864 1720 768 864 1720 768 32 26,44 24576 1720 864 768 64 26,59 49152

E 720 3680 64 744 1720 256 744 1720 256 24 30,25 6144 1720 744 256 64 26,59 16384

G* 480 3280 16 474 1520 64 474 1520 64 16 28,50 1024 1520 474 64 56 26,82 3584

Total 336 1344 1344 41984 1344 85504

Type Width Lenght n° Width Lenght n° Width Lenght n° Strips Pitch Total strips Width Lenght n° Strips Pitch Total strips

B 1080 3900 140 1104 1830 560 1104 1830 560 32 33,94 17920 1830 1104 560 64 28,31 35840

C 960 3900 8 984 1830 32 984 1830 32 32 30,19 1024 1830 984 32 64 28,31 2048

D 840 3900 12 864 1830 48 864 1830 48 32 26,44 1536 1830 864 48 64 28,31 3072

E 720 3900 16 744 1830 64 744 1830 64 24 30,25 1536 1830 744 64 64 28,31 4096

Total 176 704 704 22016 704 45056

Type Width Lenght n° Width Lenght n° Width Lenght n° Strips Pitch Total strips Width Lenght n° Strips Pitch Total strips

B 1080 3200 16 1104 2960 32 1104 1480 64 40 27,15 2560 1480 1104 64 48 30,58 3072

B* 1080 3200 12 1074 2960 24 1074 1480 48 40 26,40 1920 1480 1074 48 48 30,58 2304

C 960 3200 16 984 2960 32 984 1480 64 32 30,19 2048 1480 984 64 48 30,58 3072

C* 960 3200 24 954 2960 48 954 1480 96 32 29,25 3072 1480 954 96 48 30,58 4608

D 840 3200 48 864 2960 96 864 1480 192 32 26,44 6144 1480 864 192 48 30,58 9216

E 720 3200 184 744 2960 368 744 1480 736 24 30,25 17664 1480 744 736 48 30,58 35328

Total 300 600 1200 33408 1200 57600

Grand Total 1004 3416 4016 119936 4016 249600

RPC units for BOL chambers

Units Gas volumes eta readout panels phi readout panels

RPC units for BML chambers

Units Gas volumes eta readout panels phi readout panels

RPC units for BOS chambers

Units Gas volumes eta readout panels

Note: 12 out of 184 E type units have two holes for alignment corridors

phi readout panels

Note: 24 out of 140 B type units have two holes for alignment corridors

RPC units for BMS chambers

Units Gas volumes eta readout panels phi readout panels